= 1024k Fluid Storage Part
:icon: 1024k-fluid-storage-part.png
:from: v0.9.0-beta

The {doctitle} is used to craft the xref:1024k-fluid-storage-disk.adoc[] and xref:1024k-fluid-storage-block.adoc[].