= 1024k Fluid Storage Disk
:icon: 1024k-fluid-storage-disk.png
:from: v0.9.0-beta

include::../../partials/fluid-storage-disk.adoc[]

== Storage capacity

The {doctitle} can store 1024.000 millibuckets or 1024 buckets of any fluid.