= 4096k Fluid Storage Block
:icon: 4096k-fluid-storage-block.png
:from: v0.9.0-beta

include::../../partials/fluid-storage-block.adoc[]

== Storage capacity

The {doctitle} can store 4096.000 millibuckets or 4096 buckets of any fluid.