= 64k Fluid Storage Block
:icon: 64k-storage-block.png
:from: v0.9.0-beta

include::../../partials/fluid-storage-block.adoc[]

== Storage capacity

The {doctitle} can store 64.000 millibuckets or 64 buckets of any fluid.